<template>
  <section id="Content" class="p-6 pb-24">
    <!-- Breadcrumb -->
    <div id="ViewBreadcrumb" class="mb-8">
      <h1 class="text-lg text-center font-light relative px-7">
        <!-- Cancel -->
        <router-link
          :to="{ name: 'account' }"
          class="text-lg text-center px-2 py-1 absolute -left-2 -top-1"
          ><fa icon="chevron-left" class="fa-fw"></fa
        ></router-link>

        Scan Contact
      </h1>
    </div>

    <form>
      <h3 class="text-sm uppercase font-semibold mb-2">Scan a QR Code…</h3>
      <div class="bg-black rounded overflow-hidden relative mb-4">
        <img src="https://picsum.photos/400/400?random=1" class="w-full" />

        <!-- Darken overlay -->
        <!-- Top -->
        <div class="absolute top-0 left-0 right-0 bg-black/50 h-1/4"></div>
        <!-- Reft -->
        <div class="absolute top-1/4 bottom-1/4 left-0 bg-black/50 w-1/4"></div>
        <!-- Right -->
        <div
          class="absolute top-1/4 bottom-1/4 right-0 bg-black/50 w-1/4"
        ></div>
        <!-- Bottom -->
        <div class="absolute bottom-0 left-0 right-0 bg-black/50 h-1/4"></div>

        <!-- Reticle overlay -->
        <!-- Top-left -->
        <div
          class="absolute top-1/4 left-1/4 h-6 w-6 border-white border-t-4 border-l-4 drop-shadow"
        ></div>
        <!-- Top-right -->
        <div
          class="absolute top-1/4 right-1/4 h-6 w-6 border-white border-t-4 border-r-4 drop-shadow"
        ></div>
        <!-- Bottom-left -->
        <div
          class="absolute bottom-1/4 left-1/4 h-6 w-6 border-white border-b-4 border-l-4 drop-shadow"
        ></div>
        <!-- Bottom-right -->
        <div
          class="absolute bottom-1/4 right-1/4 h-6 w-6 border-white border-b-4 border-r-4 drop-shadow"
        ></div>
      </div>

      <h3 class="text-sm uppercase font-semibold mb-2">
        …or Enter Contact Data
      </h3>
      <input
        type="text"
        placeholder="Name (optional)"
        class="block w-full rounded border border-slate-400 mb-2 px-3 py-2"
      />
      <input
        type="text"
        placeholder="ID"
        class="block w-full rounded border border-slate-400 mb-2 px-3 py-2"
      />
      <input
        type="text"
        placeholder="Public Key (optional)"
        class="block w-full rounded border border-slate-400 mb-4 px-3 py-2"
      />

      <div class="mt-8">
        <input
          type="submit"
          class="block w-full text-center text-lg font-bold uppercase bg-blue-600 text-white px-2 py-3 rounded-md mb-2"
          value="Look Up Contact"
        />
        <button
          type="button"
          class="block w-full text-center text-md uppercase bg-slate-500 text-white px-1.5 py-2 rounded-md"
        >
          Cancel
        </button>
      </div>
    </form>
  </section>
</template>

<script lang="ts">
import { Options, Vue } from "vue-class-component";

@Options({
  components: {},
})
export default class ContactScanView extends Vue {}
</script>
