<blockquote><img src=../graphic/sbi.gif><br><br>You have logged in to complete the <i>Demo Survey 1.</i>
 <br><br>
This survey is a sampling of questions, the full survey will consist of multiple sections and approximately 40 questions.
There is no time-limit for completing this survey.  At any time you may click the <i>Pause</i> button and will be given the option to log out. If for any reason you get accidentally disconnected before completing the survey (e.g. lost internet connection), simply login again when service is restored and the survey will be resumed at the page last viewed.<br><br>
Special Instructions</i><br><br>
You must review the confidentiality agreement. By proceeding with this item you are explicitly agreeing to abide by the terms and conditions of the agreement.
After the final question, click the "Done" button to submit your responses. <br><br><i><i>Note- This is a custom page, all content here as well as the features for survey delivery (e.g. the Pause button) are options you choose and control.</i><RAWHTML><RAWHTML><RAWHTML><RAWHTML>