<center><IMG SRC="/graphic/org.amtda.gif" width=150 BORDER=0></center>
<div align="center"><font color="#003399" size="+2" face="Times New Roman, Times, serif"><br><b>Welcome 
  to the <i>Sample</i> CMTSE Exam Online</b> </font></div>
<blockquote> 
  <p><br>
    <font size="3" face="Times New Roman, Times, serif">Congratulations on your 
    interest in the <b><font color="#003399">Certified Machine Tool Sales 
    Engineer (CMTSE)</font></b> credential - the <i>only</i> industry designation specifically 
    for machine tool sales engineers.</font></p>
  <blockquote> 
    <p><font size="3" face="Times New Roman, Times, serif"><b><font color="#003399">Today, 
      you are taking your first step toward joining a select group of individuals 
      who are committed to excellence in machine tool sales.</font></b></font></p>
  </blockquote>
  <p><font size="3" face="Times New Roman, Times, serif">This <i>sample</i> test
    has 30 questions. It illustrates the type of questions and scope of information that you will find on the official CMTSE Examination.<br> <br>(<i>Please note:</i> 
    the answer key displayed at the end of this <i>sample</i> test will <i>not</i> appear 
    on the official CMTSE Examination. <font size="3" face="Times New Roman, Times, serif"> After you have completed this test, you will have an opportunity to learn more about the CMTSE Program - and how to register for the very next CMTSE Exam.)
</font></p>
<p><b>General Instructions:</b></p>
<p>
<li>You have 45 minutes to complete the 30 questions. The timer will pause automatically while questions are being retrieved from the server, so internet-response time is not part of the 45 minutes.  <li>The time remaining and question counter will display in the upper right-hand corner.  <li>During the exam, you can navigate sequentially from question to question by clicking 
    the <b>Next </b>and <b>Back</b> buttons. </li>
  <li>During the exam, mark any questions you wish to revisit by clicking the 
    checkbox marked <i>"Click here to review this question at the end of the test</i>," located on each 
    question screen.  When you reach the end of the exam, you may revisit any 
    questions marked for review. </li>
<li>Should you get disconnected while taking the exam, log back in and you will be able to resume the test where you left off.
</p>
</blockquote>